FDA Certified I Red & Near-Infrared Light Therapy Panel I 40 LEDs for Skin & Pain Relief

FDA Certified – Experience Clinic-Grade Light Therapy at Home

Fantastic starter panel for the young and old, Transform your wellness routine with this compact, table-top LED panel, designed for red light therapy near me convenience!

Harness 660nm red light (collagen stimulation, acne reduction) and 850nm near-infrared (muscle recovery, inflammation relief) with 110mW irradiance for deep cellular repair.

PubMed-backed and FDA-certified, Light Therapy is ideal for:

Skin Rejuvenation & Anti-Aging

Red light kills bacteria to combat acne and eczema.

Boost collagen for visible red light before and after results (wrinkles, scars).

Pain Relief & Inflammation Reduction

Target sore muscles, joint pain, or light therapy for trauma recovery.

Near-infrared benefits include accelerated post-workout healing.

Mental Wellness & Holistic Care

Improve circadian rhythm to optimise sleep.

Pair with complementary therapies (chromotherapy, photodynamic therapy) for holistic results.

Technical Excellence

LEDs: 40 medical-grade (20×660nm + 20×850nm) with 50,000-hour lifespan.

Beam Angles: 30°.

Safety: 10-minute timer prevents too much red light therapy; UKCA/CE/FDA/RoHS-certified.

Design: Space-saving kick-stand for desks, nightstands, or travel.

WHAT’S IN THE BOX?

x1′ x40 LED Table-Top Panel (with Kick-Stand)

x1 Protective Eyewear

x1 Power Cable (select Plug-Type)

x1 User Manual

More information regarding LED Light Therapy Scientific Studies and Research can be found at LED Light Therapy Wisdom (Blog) Page, Select Blue Wisdom Link: WISDOM

The post FDA Certified I Red & Near-Infrared Light Therapy Panel I 40 LEDs for Skin & Pain Relief appeared first on LED Light Therapy Shop.