Red Light Therapy Boot | Plantar Fasciitis, Foot Pain & Neuropathy Relief

Red Light Therapy Boot | Foot Pain, Plantar Fasciitis & Neuropathy Relief

LED Light Therapy Shops FDA-cleared Red Light Therapy Boot delivers 660nm red light (skin repair) and 850nm near-infrared (deep tissue healing), directly to your foot, worth an option to use Pulse treatment mode (10Hz) for enhanced treatment.

Ideal for common foot issues, Red Light Therapy Boot provides:

Targeted Pain Relief & Recovery

Plantar Fasciitis: Reduce heel pain and inflammation.

Neuropathy: Soothe nerve pain and tingling associated with diabetes.

Arthritis: Ease joint stiffness and improve mobility.

Skin Health & Circulation Boost

Red light therapy benefits: Repair cracked heels, calluses, and fungal-prone skin.

Near-infrared benefits: Enhance blood flow to reduce swelling and accelerate post-surgery recovery.

Safe, Non-Invasive Technology

15-minute timer prevents overuse (too much red light therapy).

0 EMF emissions – safe for sensitive skin and diabetic foot care.

Red Light Therapy Boot Technical Specification (summary)

LEDs: x296 triple LEDs medical-grade (total: x888) – 140mW/cm² irradiance.

Treatment Modes: Red, NIR, or Combined – toggle via button.

Pulse Treatment Mode: 10Hz

Battery: Rechargeable via USB-C (included) – lightweight, wipeable design.

Certifications: FDA, UKCA, CE, RoHS, FCC – 1-year warranty.

How to Use our Red Light Therapy Boot, 5 Easy Steps (user manual provided, quick guide below)

Clean: Ensure your foot is clean, dry and free from ointments (creams or oils)

Turn On (button turns Green): Press the button to turn on

Light Therapy Treatment (button remains Green): Press the button Once for Red, Twice for NIR, or Three times for Red+NIR (you will visually see the difference as NIR is colourless however the button remains on when in NIR mode).

Pulse Mode (Button turns Blue): Press and hold button for 10Hz to pulse any of the light therapy treatment modes.

Treatment Timer: 15 minutes, Auto shut-off (or press button until it switches off)

Treatment Frequency: 1-2 a day for at least once a week (can use in motion – do not expose to moisture)

WHAT’S IN THE BOX?

x1 x888 LEDs Red Light Therapy Boot Size: UK 9.5 Boot

x1 USB Type-C cable

– x1 User Manual

Why Choose LED Light Therapy Shop?

Every product from LED Light Therapy Shop, built for purpose, and produced by FDA-registered manufacturers and many products FDA Cleared.
LED Light Therapy Shop devices deliver the same wavelength precision trusted in clinical environments — making advanced light therapy simple, safe, and accessible at home.

Further Reading and Pain Management Clinical Studies

660/850 nm LED on the microcirculation of the foot: neurovascular biphasic reflex

Light Therapy for Plantar Fasciitis

Low-intensity LASER and LED (photobiomodulation) for musculoskeletal pain – PubMed Central

Red light-emitting diode on skin healing – ScienceDirect

Prevention and reversal of neuropathic pain by near-infrared light – ScienceDirect, 2024

LED Light Therapy Shop Pain Management Guide

This device supports general wellness and comfort. It is not a substitute for medical diagnosis or treatment.

More information regarding LED Light Therapy Scientific Studies and Research can be found at LED Light Therapy Shop Wisdom Page, Select: WISDOM

Written and reviewed by LED Light Therapy Shop November 2025 – Specialists in FDA-cleared blue, red, and near-infrared LED light therapy devices.

The post Red Light Therapy Boot | Plantar Fasciitis, Foot Pain & Neuropathy Relief appeared first on LED Light Therapy Shop.