Red & Near-Infrared Light Therapy Shoe – Pain Relief & Recovery

Red & Near-Infrared Light Therapy Shoe / Slipper

These FDA cleared red & near-infrared light therapy shoe/slipper combines 660nm red light (skin repair, bacteria reduction) and 850nm near-infrared (deep tissue healing, inflammation relief) for targeted foot and lower-body wellness.

Rechargeable via USB-C, wipeable, and EMF-free – ideal for at-home red light therapy near me convenience.

With 324 medical-grade LEDs, a 15-minute timer, and 10Hz pulse settings, they’re designed for:

Targeted Relief for Feet & Lower Body

Red light therapy benefits: Reduce plantar fasciitis, arthritis, and neuropathy pain.

Near-infrared benefits: Improve circulation and accelerate post-workout recovery.

Holistic Wellness & Recovery

Combat inflammation and stiffness with infrared lamp benefits for joints and muscles.

Pair with complementary therapies (chromotherapy, photodynamic therapy) for enhanced results.

Safe, Clinic-Grade Technology

EMF 0 UT and 140mW/cm² irradiance for deep, non-invasive healing.

15-minute auto-shutoff prevents overuse, while USB-C charging ensures portability.

Technical Specifications of red & near-infrared light therapy shoe/slipper

LEDs: 8W power, 50,000-hour lifespan.

Modes: Red, NIR, or Combined – toggle via button control.

Battery: Rechargeable built-in (USB-C included) – lightweight and portable.

Certifications: FDA, UKCA, CE, RoHS, FCC – medical-grade safety.

Size: 9.5 UK / 10 US / 44EU – wipeable, ergonomic design.

WHAT’S IN THE BOX?

x1 x324 LEDs Full Shoe/Slipper (Not a pair, fits Left or Right foot)

x1 USB Type-C cable

x1 User Manual

Why Choose LED Light Therapy Shop?

Every product from LED Light Therapy Shop, built for purpose, and produced by FDA-registered manufacturers and many products FDA Cleared.
LED Light Therapy Shop devices deliver the same wavelength precision trusted in clinical environments — making advanced light therapy simple, safe, and accessible at home.

Further Reading and Pain Management Clinical Studies

660/850 nm LED on the microcirculation of the foot: neurovascular biphasic reflex

Light Therapy for Plantar Fasciitis

Low-intensity LASER and LED (photobiomodulation) for musculoskeletal pain – PubMed Central

Red light-emitting diode on skin healing – ScienceDirect

Prevention and reversal of neuropathic pain by near-infrared light – ScienceDirect, 2024

LED Light Therapy Shop Pain Management Guide

This device supports general wellness and comfort. It is not a substitute for medical diagnosis or treatment.

More information regarding LED Light Therapy Scientific Studies and Research can be found at LED Light Therapy Shop Wisdom Page, Select: WISDOM

Written and reviewed by LED Light Therapy Shop November 2025 – Specialists in FDA-cleared blue, red, and near-infrared LED light therapy devices.

The post Red & Near-Infrared Light Therapy Shoe – Pain Relief & Recovery appeared first on LED Light Therapy Shop.