Red & NIR Light Therapy Slip-On Slipper – FDA-Certified

Step Into Pain-Free Living with Medical-Grade Red + NIR Light Therapy

These FDA/UKCA-certified light therapy slippers combine 660nm red light (skin repair, bacteria reduction) and 850nm near-infrared (deep tissue healing, inflammation relief) for targeted foot and lower-body wellness. With 264 medical-grade LEDs, a 15-minute timer, and 10Hz pulse settings, they’re designed for:

Targeted Relief for Feet & Lower Body

Red light therapy benefits: Reduce plantar fasciitis, arthritis, and neuropathy pain.

Near-infrared benefits: Improve circulation and accelerate post-workout recovery.

Holistic Wellness & Recovery

Combat inflammation and stiffness with infrared lamp benefits for joints and muscles.

Pair with complementary therapies (chromotherapy, photodynamic therapy) for enhanced results.

Safe, Clinic-Grade Technology

EMF 0 UT and 140mW/cm² irradiance for deep, non-invasive healing.

15-minute auto-shutoff prevents overuse, while USB-C charging ensures portability.

Technical Specifications

LEDs: 264 (88×660nm + 176×850nm) – 8W power, 50,000-hour lifespan.

Modes: Red, NIR, or Combined – toggle via button control.

Battery: Rechargeable built-in (USB-C included) – lightweight and portable.

Certifications: FDA, UKCA, CE, RoHS, FCC – medical-grade safety.

Size: 8 UK / 10 US / 40-41 EU – wipeable, ergonomic design.

WHAT’S IN THE BOX?

x1 Red Light Therapy Slip-On Slipper (Not a pair. Slipper Fits Left or Right Foot)

x1 USB Type-C cable

x1 User Manual

More information regarding LED Light Therapy Scientific Studies and Research can be found at LED Light Therapy Wisdom (Blog) Page, Select Blue Wisdom Link: WISDOM

The post Red & NIR Light Therapy Slip-On Slipper – FDA-Certified appeared first on LED Light Therapy Shop.